-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.109597965961
cusum  =  0.154437016639
eta  =  0.598210212499
hl_amp_ratio  =  0.891623631423
kurtosis  =  -0.591896435583
n_points  =  399
period  =  0.614938403704
period_SNR  =  48.9463345683
period_log10FAP  =  -49.5448451436
period_uncertainty  =  0.000106243680256
phase_cusum  =  0.245138618632
phase_eta  =  0.521051855777
phi21  =  1.4436101089
phi31  =  3.31287694806
quartile31  =  0.14
r21  =  0.379477030392
r31  =  0.146832423803
shapiro_w  =  0.981877565384
skewness  =  -0.275632156356
slope_per10  =  -0.159220971952
slope_per90  =  0.155609992281
stetson_k  =  0.814668577583
weighted_mean  =  13.8252034922
weighted_std  =  0.0914281460657
