<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.35


######### Lightcurve features #########

amplitude  =  0.380633349003
cusum  =  0.2950289695
eta  =  0.574647513102
hl_amp_ratio  =  0.32832514301
kurtosis  =  0.862121055607
n_points  =  41
period  =  0.98125497601
period_SNR  =  7.38197270792
period_log10FAP  =  -1.55309027247
period_uncertainty  =  0.000156917110605
phase_cusum  =  0.299814230423
phase_eta  =  0.486185446614
phi21  =  -3.58622489559
phi31  =  -3.18208510295
quartile31  =  0.24
r21  =  0.36255228355
r31  =  0.257821062391
shapiro_w  =  0.830620706081
skewness  =  -1.33771423009
slope_per10  =  -0.554700004868
slope_per90  =  0.332249999046
stetson_k  =  0.608259814976
weighted_mean  =  17.1671071398
weighted_std  =  0.277965386692
</pre></body></html>