-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.32


######### Lightcurve features #########

amplitude  =  0.341905351632
cusum  =  0.266634259913
eta  =  0.586177004002
hl_amp_ratio  =  0.172875737821
kurtosis  =  1.17837983475
n_points  =  51
period  =  0.717394951502
period_SNR  =  7.66098791416
period_log10FAP  =  -2.88024129962
period_uncertainty  =  0.000111336225464
phase_cusum  =  0.375418051724
phase_eta  =  0.521304852298
phi21  =  -0.234935222249
phi31  =  1.79083102489
quartile31  =  0.315
r21  =  0.209672609469
r31  =  0.0827195745733
shapiro_w  =  0.799627900124
skewness  =  -1.35301581707
slope_per10  =  -0.50639738099
slope_per90  =  0.29117938804
stetson_k  =  0.571250519976
weighted_mean  =  15.7659869572
weighted_std  =  0.304627491423
