-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.232791808808
cusum  =  0.132318178504
eta  =  0.626421541832
hl_amp_ratio  =  1.11246024241
kurtosis  =  -0.35568010728
n_points  =  395
period  =  0.650491126678
period_SNR  =  42.3787398665
period_log10FAP  =  -42.6483617212
period_uncertainty  =  0.000143143363495
phase_cusum  =  0.238192417323
phase_eta  =  0.33103380769
phi21  =  1.18208599355
phi31  =  -0.550603934818
quartile31  =  0.29
r21  =  0.525668388759
r31  =  0.361072242697
shapiro_w  =  0.98911100626
skewness  =  -0.144897094969
slope_per10  =  -0.112491804399
slope_per90  =  0.218770635744
stetson_k  =  0.802665190498
weighted_mean  =  13.1268147208
weighted_std  =  0.204874517792
