-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.6


######### Lightcurve features #########

amplitude  =  0.461071026517
cusum  =  0.291740245558
eta  =  0.888368097135
hl_amp_ratio  =  0.783383300081
kurtosis  =  -0.735698542374
n_points  =  41
period  =  0.736962717809
period_SNR  =  7.26890523856
period_log10FAP  =  -2.29462210597
period_uncertainty  =  0.00014754599707
phase_cusum  =  0.233339071447
phase_eta  =  0.50659771459
phi21  =  -3.80937691368
phi31  =  -4.89033069891
quartile31  =  0.72
r21  =  0.44468553704
r31  =  0.235632798342
shapiro_w  =  0.908839821815
skewness  =  -0.204314443169
slope_per10  =  -0.431800009683
slope_per90  =  0.496800001711
stetson_k  =  0.855507441602
weighted_mean  =  15.5810780669
weighted_std  =  0.399374917541
