-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.216359560673
cusum  =  0.119151524339
eta  =  0.736923924927
hl_amp_ratio  =  0.798414881574
kurtosis  =  -0.780896662683
n_points  =  391
period  =  0.702152612889
period_SNR  =  47.7455280004
period_log10FAP  =  -48.4095593356
period_uncertainty  =  0.00012827048509
phase_cusum  =  0.235648713776
phase_eta  =  0.3773633425
phi21  =  1.17023597791
phi31  =  -0.60343813065
quartile31  =  0.33
r21  =  0.463377129626
r31  =  0.314196089583
shapiro_w  =  0.979852974415
skewness  =  -0.090408834605
slope_per10  =  -0.123684785621
slope_per90  =  0.141051879754
stetson_k  =  0.828927547293
weighted_mean  =  17.6339291537
weighted_std  =  0.195217589968
