<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_c
class_probability =  0.47


######### Lightcurve features #########

amplitude  =  0.349369446647
cusum  =  0.206860177564
eta  =  0.537394424248
hl_amp_ratio  =  1.29332446972
kurtosis  =  -1.30591272658
n_points  =  103
period  =  0.311122611494
period_SNR  =  10.6153181031
period_log10FAP  =  -8.69511264082
period_uncertainty  =  2.38408132813e-05
phase_cusum  =  0.466008287486
phase_eta  =  0.0454210328989
phi21  =  1.95455070223
phi31  =  0.861580552382
quartile31  =  0.595
r21  =  0.378021262334
r31  =  0.134104797619
shapiro_w  =  0.928959429264
skewness  =  0.120141980614
slope_per10  =  -0.147790519213
slope_per90  =  0.48240003176
stetson_k  =  0.863892731572
weighted_mean  =  14.1319025118
weighted_std  =  0.317013602107
</pre></body></html>