-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.16469973308
cusum  =  0.112986691822
eta  =  0.531552929669
hl_amp_ratio  =  0.751904965282
kurtosis  =  -0.707080546454
n_points  =  341
period  =  0.610278924094
period_SNR  =  47.1588520813
period_log10FAP  =  -47.2873781369
period_uncertainty  =  0.000105097289638
phase_cusum  =  0.224483160299
phase_eta  =  0.221994649949
phi21  =  -2.01070580198
phi31  =  -3.78438805685
quartile31  =  0.21
r21  =  0.423338559497
r31  =  0.249390082819
shapiro_w  =  0.960076808929
skewness  =  -0.454506393093
slope_per10  =  -0.163866602487
slope_per90  =  0.25277329888
stetson_k  =  0.823882778357
weighted_mean  =  13.9580155449
weighted_std  =  0.132793957897
