-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.85


######### Lightcurve features #########

amplitude  =  0.188593533326
cusum  =  0.11110095716
eta  =  0.68332758378
hl_amp_ratio  =  0.531697692024
kurtosis  =  -0.743979646857
n_points  =  117
period  =  0.741965775428
period_SNR  =  13.6572590113
period_log10FAP  =  -11.8254956793
period_uncertainty  =  0.000155652808336
phase_cusum  =  0.225815950891
phase_eta  =  0.163642293904
phi21  =  0.67074284169
phi31  =  1.82275002092
quartile31  =  0.29
r21  =  0.53588864302
r31  =  0.391127142016
shapiro_w  =  0.920562028885
skewness  =  -0.625577685806
slope_per10  =  -0.291810420184
slope_per90  =  0.615799995139
stetson_k  =  0.783737206279
weighted_mean  =  12.9364646465
weighted_std  =  0.182984865143
