-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  CEPH_Other
class_probability =  0.52


######### Lightcurve features #########

amplitude  =  0.240986434816
cusum  =  0.114772569081
eta  =  0.595625331096
hl_amp_ratio  =  0.507238099253
kurtosis  =  1.23151345908
n_points  =  308
period  =  0.529543842483
period_SNR  =  38.4073962557
period_log10FAP  =  -33.4451528406
period_uncertainty  =  7.79887854948e-05
phase_cusum  =  0.23838527564
phase_eta  =  0.654142341467
phi21  =  0.715328489774
phi31  =  1.36748919595
quartile31  =  0.2
r21  =  0.216466081564
r31  =  0.097259676072
shapiro_w  =  0.926513791084
skewness  =  -0.609313341019
slope_per10  =  -0.115481193679
slope_per90  =  0.132556467276
stetson_k  =  0.706512944874
weighted_mean  =  13.40543234
weighted_std  =  0.179743605565
