-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.8


######### Lightcurve features #########

amplitude  =  0.315867767663
cusum  =  0.213221971651
eta  =  0.624808428277
hl_amp_ratio  =  0.922749118726
kurtosis  =  -0.925223169442
n_points  =  69
period  =  0.137669482573
period_SNR  =  8.77458189989
period_log10FAP  =  -4.58036209018
period_uncertainty  =  5.14837035938e-06
phase_cusum  =  0.26568153339
phase_eta  =  0.507562804706
phi21  =  -0.731081779382
phi31  =  -0.781304344535
quartile31  =  0.39
r21  =  0.0954405910987
r31  =  0.109820643388
shapiro_w  =  0.952246308327
skewness  =  -0.196347275321
slope_per10  =  -0.0586731956604
slope_per90  =  0.067148059188
stetson_k  =  0.81430070712
weighted_mean  =  15.9995757219
weighted_std  =  0.270739939103
