-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.96


######### Lightcurve features #########

amplitude  =  0.204042998677
cusum  =  0.109614278225
eta  =  0.655455184336
hl_amp_ratio  =  0.338882520213
kurtosis  =  0.833042045182
n_points  =  444
period  =  0.595058328375
period_SNR  =  44.1603871912
period_log10FAP  =  -45.7560411748
period_uncertainty  =  0.000110646773698
phase_cusum  =  0.303121242848
phase_eta  =  0.603663479606
phi21  =  0.448365701755
phi31  =  1.42484419827
quartile31  =  0.2025
r21  =  0.34876169521
r31  =  0.20070841381
shapiro_w  =  0.883387923241
skewness  =  -1.1971226266
slope_per10  =  -0.075396798931
slope_per90  =  0.098345034198
stetson_k  =  0.7037303076
weighted_mean  =  12.9321129944
weighted_std  =  0.168406339935
