-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.93


######### Lightcurve features #########

amplitude  =  0.331827492364
cusum  =  0.185818843151
eta  =  0.510323858208
hl_amp_ratio  =  0.808592365143
kurtosis  =  -1.2561179277
n_points  =  204
period  =  0.62958900655
period_SNR  =  24.2032185342
period_log10FAP  =  -25.359253841
period_uncertainty  =  0.000107401744138
phase_cusum  =  0.248192272485
phase_eta  =  0.0932767989145
phi21  =  3.83741316875
phi31  =  5.13555931453
quartile31  =  0.48
r21  =  0.424537105709
r31  =  0.22458410554
shapiro_w  =  0.935464501381
skewness  =  -0.182053714828
slope_per10  =  -0.20263719163
slope_per90  =  0.505005450696
stetson_k  =  0.867783104919
weighted_mean  =  13.9876060752
weighted_std  =  0.270051304247
