-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.7


######### Lightcurve features #########

amplitude  =  0.438706574216
cusum  =  0.206107756146
eta  =  0.670437856453
hl_amp_ratio  =  0.455043269434
kurtosis  =  0.431338624199
n_points  =  82
period  =  0.666334736091
period_SNR  =  12.9736377395
period_log10FAP  =  -6.71440674749
period_uncertainty  =  0.000132010214993
phase_cusum  =  0.325039984793
phase_eta  =  0.174630577067
phi21  =  0.716646840901
phi31  =  1.57409242676
quartile31  =  0.3725
r21  =  0.502248584137
r31  =  0.266337013902
shapiro_w  =  0.881675541401
skewness  =  -1.09794213124
slope_per10  =  -0.549112544601
slope_per90  =  0.609212536571
stetson_k  =  0.717354466564
weighted_mean  =  12.0238877339
weighted_std  =  0.3136566907
