-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.346043151997
cusum  =  0.127612718352
eta  =  0.572988806695
hl_amp_ratio  =  0.658385627462
kurtosis  =  -0.962759124718
n_points  =  387
period  =  0.718321218052
period_SNR  =  48.546734549
period_log10FAP  =  -53.7148493878
period_uncertainty  =  0.000165397480114
phase_cusum  =  0.27735604898
phase_eta  =  0.15907136266
phi21  =  -1.93923176273
phi31  =  -0.763328804179
quartile31  =  0.48
r21  =  0.487096129603
r31  =  0.312859460354
shapiro_w  =  0.940522134304
skewness  =  -0.444388292979
slope_per10  =  -0.123994417162
slope_per90  =  0.265666667062
stetson_k  =  0.827592655704
weighted_mean  =  14.1405415397
weighted_std  =  0.300386843478
