<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.89


######### Lightcurve features #########

amplitude  =  0.406755878673
cusum  =  0.175708110191
eta  =  0.499468759574
hl_amp_ratio  =  0.412094923136
kurtosis  =  -0.74532114745
n_points  =  189
period  =  0.477043071662
period_SNR  =  22.7157217644
period_log10FAP  =  -21.5875085279
period_uncertainty  =  7.41556168489e-05
phase_cusum  =  0.283288151806
phase_eta  =  0.113356965425
phi21  =  0.688634098359
phi31  =  1.62449197393
quartile31  =  0.59
r21  =  0.446509978864
r31  =  0.342022444332
shapiro_w  =  0.903609633446
skewness  =  -0.667885433179
slope_per10  =  -0.201960983817
slope_per90  =  0.252000009641
stetson_k  =  0.749975568685
weighted_mean  =  14.5979757912
weighted_std  =  0.351330717628
</pre></body></html>