-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.357163133126
cusum  =  0.0969981337946
eta  =  0.585198370985
hl_amp_ratio  =  0.298021301939
kurtosis  =  -0.482502935511
n_points  =  421
period  =  0.618811409875
period_SNR  =  48.0311149333
period_log10FAP  =  -56.5562029866
period_uncertainty  =  0.000122707006585
phase_cusum  =  0.222323689093
phase_eta  =  0.100680883444
phi21  =  -2.22214150967
phi31  =  -4.29069870868
quartile31  =  0.45
r21  =  0.462757226945
r31  =  0.313481715122
shapiro_w  =  0.906755745411
skewness  =  -0.759984241035
slope_per10  =  -0.109876289235
slope_per90  =  0.235503264101
stetson_k  =  0.733410467915
weighted_mean  =  15.4217351741
weighted_std  =  0.30258869281
