-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.48


######### Lightcurve features #########

amplitude  =  0.269110060414
cusum  =  0.0942047991918
eta  =  0.617240191173
hl_amp_ratio  =  0.491452074603
kurtosis  =  -0.753257189533
n_points  =  395
period  =  0.613177745612
period_SNR  =  52.8770948841
period_log10FAP  =  -60.5994941385
period_uncertainty  =  0.000120482925587
phase_cusum  =  0.257870893501
phase_eta  =  0.286642765436
phi21  =  0.884367958007
phi31  =  -1.12874467511
quartile31  =  0.335
r21  =  0.264500394847
r31  =  0.0827107295394
shapiro_w  =  0.948610007763
skewness  =  -0.502990094261
slope_per10  =  -0.102438462352
slope_per90  =  0.108645782091
stetson_k  =  0.780039896002
weighted_mean  =  13.1133914894
weighted_std  =  0.215478754277
