-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.64


######### Lightcurve features #########

amplitude  =  0.204396366874
cusum  =  0.373834052662
eta  =  0.580791083701
hl_amp_ratio  =  0.733233667657
kurtosis  =  -0.5781341806
n_points  =  26
period  =  0.207811759803
period_SNR  =  5.65205825803
period_log10FAP  =  -0.00176148021934
period_uncertainty  =  7.04080681277e-06
phase_cusum  =  0.399592317501
phase_eta  =  0.345526160319
phi21  =  1.10929611548
phi31  =  -1.04274082578
quartile31  =  0.17
r21  =  0.229349526701
r31  =  0.0338013451072
shapiro_w  =  0.978662669659
skewness  =  -0.179486649771
slope_per10  =  -0.322674812045
slope_per90  =  0.255850006361
stetson_k  =  0.780927271229
weighted_mean  =  16.1275649351
weighted_std  =  0.11412105815
