-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  CEPH_1O
class_probability =  0.47


######### Lightcurve features #########

amplitude  =  0.080006645656
cusum  =  0.11628759331
eta  =  0.689746266606
hl_amp_ratio  =  0.725458727004
kurtosis  =  -0.902473429917
n_points  =  339
period  =  0.671280832398
period_SNR  =  51.8019256702
period_log10FAP  =  -49.7998341451
period_uncertainty  =  0.000125519980353
phase_cusum  =  0.242169234332
phase_eta  =  0.446402800541
phi21  =  -2.10219213043
phi31  =  -0.923073090571
quartile31  =  0.11
r21  =  0.19329259289
r31  =  0.0385127905731
shapiro_w  =  0.968124330044
skewness  =  -0.191182501864
slope_per10  =  -0.240500015207
slope_per90  =  0.258999993093
stetson_k  =  0.835971609348
weighted_mean  =  15.93450774
weighted_std  =  0.0658264830982
