-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.341904016318
cusum  =  0.188419879107
eta  =  0.501422598599
hl_amp_ratio  =  0.277903429573
kurtosis  =  -0.269201649853
n_points  =  187
period  =  0.606246163572
period_SNR  =  21.5922345941
period_log10FAP  =  -20.7903154161
period_uncertainty  =  0.000139734058803
phase_cusum  =  0.225297152845
phase_eta  =  0.0668648211087
phi21  =  -2.05090114168
phi31  =  -0.810817865618
quartile31  =  0.4
r21  =  0.574257389631
r31  =  0.318762284821
shapiro_w  =  0.883832812309
skewness  =  -0.923836522552
slope_per10  =  -0.202999990433
slope_per90  =  0.372951146786
stetson_k  =  0.674893187784
weighted_mean  =  14.6971675828
weighted_std  =  0.305034454476
