-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.8


######### Lightcurve features #########

amplitude  =  0.280014534667
cusum  =  0.220921453639
eta  =  0.571159308299
hl_amp_ratio  =  1.1326918367
kurtosis  =  -1.19345812192
n_points  =  88
period  =  0.607683260615
period_SNR  =  12.5168145245
period_log10FAP  =  -10.420825438
period_uncertainty  =  0.000118373710992
phase_cusum  =  0.259364948004
phase_eta  =  0.251309060286
phi21  =  -2.11993387284
phi31  =  -3.92731603326
quartile31  =  0.4025
r21  =  0.316020236802
r31  =  0.153711219557
shapiro_w  =  0.943700432777
skewness  =  -0.156777134152
slope_per10  =  -0.414840307049
slope_per90  =  0.461399983615
stetson_k  =  0.877218789701
weighted_mean  =  13.1530152672
weighted_std  =  0.2107286336
