-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.61


######### Lightcurve features #########

amplitude  =  0.285594126587
cusum  =  0.293485648411
eta  =  0.54329014253
hl_amp_ratio  =  0.232067654233
kurtosis  =  -0.287845488998
n_points  =  28
period  =  0.826857638184
period_SNR  =  4.90703658517
period_log10FAP  =  -0.222350629098
period_uncertainty  =  0.000185255640422
phase_cusum  =  0.280046960951
phase_eta  =  0.620358368263
phi21  =  2.18845060328
phi31  =  1.3542126967
quartile31  =  0.2075
r21  =  0.366703264031
r31  =  0.185796940854
shapiro_w  =  0.851157128811
skewness  =  -0.982586818713
slope_per10  =  -0.51730000414
slope_per90  =  0.778382740947
stetson_k  =  0.657841527315
weighted_mean  =  16.5872058824
weighted_std  =  0.164925820416
