-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.28444968833
cusum  =  0.130623936156
eta  =  0.470136605275
hl_amp_ratio  =  0.626092291328
kurtosis  =  -0.823117425754
n_points  =  399
period  =  0.633723537535
period_SNR  =  42.5270494079
period_log10FAP  =  -48.4227880521
period_uncertainty  =  0.000171566451732
phase_cusum  =  0.213283256307
phase_eta  =  0.36120158933
phi21  =  -2.09623190554
phi31  =  -3.96947160972
quartile31  =  0.385
r21  =  0.465257520332
r31  =  0.248242561323
shapiro_w  =  0.943892419338
skewness  =  -0.498049072565
slope_per10  =  -0.109859551768
slope_per90  =  0.17024522323
stetson_k  =  0.827556280172
weighted_mean  =  14.9273435586
weighted_std  =  0.250945780597
