-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.274503344977
cusum  =  0.12971217157
eta  =  0.547315905852
hl_amp_ratio  =  0.561221333455
kurtosis  =  -0.996320940584
n_points  =  439
period  =  0.699285505397
period_SNR  =  51.761206524
period_log10FAP  =  -61.0743939827
period_uncertainty  =  0.000127485876123
phase_cusum  =  0.28922687775
phase_eta  =  0.12832494169
phi21  =  1.08130631441
phi31  =  -0.613755136029
quartile31  =  0.38
r21  =  0.462848094119
r31  =  0.30589464494
shapiro_w  =  0.935989260674
skewness  =  -0.442479346527
slope_per10  =  -0.154394266225
slope_per90  =  0.237003230424
stetson_k  =  0.835463878221
weighted_mean  =  15.1509928952
weighted_std  =  0.226817476856
