-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.34484424152
cusum  =  0.130289384241
eta  =  0.360756942892
hl_amp_ratio  =  0.500302920303
kurtosis  =  -1.05415301937
n_points  =  399
period  =  0.634281695122
period_SNR  =  43.2203438951
period_log10FAP  =  -48.2192548246
period_uncertainty  =  0.000128901582118
phase_cusum  =  0.280230918645
phase_eta  =  0.36322343095
phi21  =  3.93828146273
phi31  =  5.36286684689
quartile31  =  0.545
r21  =  0.390878529285
r31  =  0.277097411659
shapiro_w  =  0.913312971592
skewness  =  -0.493623198409
slope_per10  =  -0.109060834397
slope_per90  =  0.115618949452
stetson_k  =  0.80254198018
weighted_mean  =  16.2329206976
weighted_std  =  0.329067951514
