-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_e
class_probability =  0.69


######### Lightcurve features #########

amplitude  =  0.164184997024
cusum  =  0.111183657743
eta  =  0.66753936595
hl_amp_ratio  =  1.07336792548
kurtosis  =  -0.189012742308
n_points  =  282
period  =  0.259475004172
period_SNR  =  21.7758481722
period_log10FAP  =  -19.455919144
period_uncertainty  =  1.49325241005e-05
phase_cusum  =  0.156599025625
phase_eta  =  1.23325933554
phi21  =  -0.729297998355
phi31  =  -0.129709804126
quartile31  =  0.22
r21  =  0.170855179542
r31  =  0.173545195966
shapiro_w  =  0.988662600517
skewness  =  -0.161160521127
slope_per10  =  -0.0362336460357
slope_per90  =  0.0246980066063
stetson_k  =  0.790343448306
weighted_mean  =  11.1191843972
weighted_std  =  0.175237553168
