-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.92


######### Lightcurve features #########

amplitude  =  0.116590480754
cusum  =  0.173487914227
eta  =  0.597789114787
hl_amp_ratio  =  1.0575865634
kurtosis  =  -0.869268041399
n_points  =  596
period  =  0.672480692437
period_SNR  =  72.4367382748
period_log10FAP  =  -90.4109809207
period_uncertainty  =  0.000117937690687
phase_cusum  =  0.278228900174
phase_eta  =  0.353687886204
phi21  =  1.08955506494
phi31  =  2.97508435619
quartile31  =  0.15
r21  =  0.299072372964
r31  =  0.104293143356
shapiro_w  =  0.979544878006
skewness  =  -0.0498316910675
slope_per10  =  -0.125291779817
slope_per90  =  0.0998638742159
stetson_k  =  0.843318449007
weighted_mean  =  15.869857546
weighted_std  =  0.0953330527293
