-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.357594664139
cusum  =  0.161495226187
eta  =  0.574368316341
hl_amp_ratio  =  0.29470925197
kurtosis  =  -0.531404545406
n_points  =  244
period  =  0.543518017585
period_SNR  =  36.5570613132
period_log10FAP  =  -30.6266195529
period_uncertainty  =  0.000137538571572
phase_cusum  =  0.270591876396
phase_eta  =  0.0975900235185
phi21  =  0.801332189583
phi31  =  2.02063085158
quartile31  =  0.43
r21  =  0.442459440832
r31  =  0.305289051776
shapiro_w  =  0.900338351727
skewness  =  -0.777978252777
slope_per10  =  -0.191847956467
slope_per90  =  0.237515826563
stetson_k  =  0.713948764295
weighted_mean  =  14.8174849982
weighted_std  =  0.292585545802
