-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.195956571625
cusum  =  0.148041028481
eta  =  0.591832495557
hl_amp_ratio  =  0.35409226698
kurtosis  =  0.22404399182
n_points  =  132
period  =  0.479047599114
period_SNR  =  13.9626832992
period_log10FAP  =  -9.76828377245
period_uncertainty  =  0.000116016239498
phase_cusum  =  0.294352374923
phase_eta  =  0.762022079547
phi21  =  -2.81654112478
phi31  =  -1.77440539226
quartile31  =  0.2225
r21  =  0.401455176181
r31  =  0.361843145882
shapiro_w  =  0.856421291828
skewness  =  -1.12138808512
slope_per10  =  -0.201077708444
slope_per90  =  0.187946723277
stetson_k  =  0.663737670888
weighted_mean  =  12.9537232525
weighted_std  =  0.224303589586
