-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.265139636214
cusum  =  0.104611041538
eta  =  0.696005955109
hl_amp_ratio  =  0.5887278476
kurtosis  =  -0.70525662795
n_points  =  600
period  =  0.63818507257
period_SNR  =  64.0359021206
period_log10FAP  =  -75.5611643301
period_uncertainty  =  0.000106229624067
phase_cusum  =  0.202864553388
phase_eta  =  0.405862261464
phi21  =  0.87724671926
phi31  =  -1.1103484007
quartile31  =  0.3925
r21  =  0.438585022809
r31  =  0.278912178226
shapiro_w  =  0.956795990467
skewness  =  -0.484105209892
slope_per10  =  -0.0583459955681
slope_per90  =  0.0406592324273
stetson_k  =  0.791080473001
weighted_mean  =  17.4463289023
weighted_std  =  0.245747927096
