-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.338158737146
cusum  =  0.145253732254
eta  =  0.582133614967
hl_amp_ratio  =  0.319984356995
kurtosis  =  -0.74981435462
n_points  =  413
period  =  0.589112251664
period_SNR  =  42.6958588206
period_log10FAP  =  -51.5694485917
period_uncertainty  =  0.000112034029725
phase_cusum  =  0.217197340598
phase_eta  =  0.29768165497
phi21  =  0.561788163525
phi31  =  1.55974446729
quartile31  =  0.5
r21  =  0.493197618441
r31  =  0.343848952968
shapiro_w  =  0.898970603943
skewness  =  -0.681816276917
slope_per10  =  -0.0944289395999
slope_per90  =  0.0969888766081
stetson_k  =  0.733916240445
weighted_mean  =  16.7774998328
weighted_std  =  0.328223369732
