-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.313046164426
cusum  =  0.195943159127
eta  =  0.660663757165
hl_amp_ratio  =  0.362049827992
kurtosis  =  -0.786537172368
n_points  =  230
period  =  0.61404333404
period_SNR  =  32.4429706794
period_log10FAP  =  -26.2239787142
period_uncertainty  =  0.000130149080463
phase_cusum  =  0.229056053288
phase_eta  =  0.430661967794
phi21  =  0.815037462778
phi31  =  4.47003027987
quartile31  =  0.51
r21  =  0.389195674951
r31  =  0.0993658061717
shapiro_w  =  0.929888904095
skewness  =  -0.418505021501
slope_per10  =  -0.0847385298438
slope_per90  =  0.294932784968
stetson_k  =  0.773488681528
weighted_mean  =  13.825747488
weighted_std  =  0.314996341136
