-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.247164847344
cusum  =  0.160922236572
eta  =  0.661849895791
hl_amp_ratio  =  0.819649238605
kurtosis  =  -0.594479140905
n_points  =  559
period  =  0.622234989961
period_SNR  =  49.3631631896
period_log10FAP  =  -55.2326028193
period_uncertainty  =  0.000120908416372
phase_cusum  =  0.216278331466
phase_eta  =  0.668485768923
phi21  =  0.903550638068
phi31  =  1.77833425077
quartile31  =  0.41
r21  =  0.448323244287
r31  =  0.309616418098
shapiro_w  =  0.980968415737
skewness  =  -0.289204932296
slope_per10  =  -0.0327043463536
slope_per90  =  0.0338141790368
stetson_k  =  0.793655241416
weighted_mean  =  18.1931170229
weighted_std  =  0.278694439775
