-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.327394334311
cusum  =  0.112665989274
eta  =  0.596076265148
hl_amp_ratio  =  0.482422031331
kurtosis  =  -1.12541528687
n_points  =  406
period  =  0.543369856166
period_SNR  =  41.400938358
period_log10FAP  =  -47.8168307575
period_uncertainty  =  0.000111177046743
phase_cusum  =  0.305372402065
phase_eta  =  0.235448060977
phi21  =  -2.38756953743
phi31  =  -4.09413474072
quartile31  =  0.51
r21  =  0.460652128782
r31  =  0.315094164025
shapiro_w  =  0.934053659439
skewness  =  -0.366260777969
slope_per10  =  -0.101583936642
slope_per90  =  0.0847226307625
stetson_k  =  0.802930547821
weighted_mean  =  16.4915837521
weighted_std  =  0.312264084163
