-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.272107285186
cusum  =  0.109681718943
eta  =  0.505171853348
hl_amp_ratio  =  0.43575265576
kurtosis  =  -0.591855189285
n_points  =  398
period  =  0.679439568909
period_SNR  =  48.021577419
period_log10FAP  =  -55.206675056
period_uncertainty  =  0.000147929371025
phase_cusum  =  0.24085601763
phase_eta  =  0.31987684426
phi21  =  1.03343952957
phi31  =  -0.962596463355
quartile31  =  0.36
r21  =  0.308647546209
r31  =  0.159898732023
shapiro_w  =  0.915050446987
skewness  =  -0.705707923792
slope_per10  =  -0.104714456261
slope_per90  =  0.236779790765
stetson_k  =  0.770067736651
weighted_mean  =  14.3589293256
weighted_std  =  0.236175165717
