-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.88


######### Lightcurve features #########

amplitude  =  0.375284770331
cusum  =  0.141353487182
eta  =  0.480528268121
hl_amp_ratio  =  0.411360013448
kurtosis  =  -0.685548382941
n_points  =  188
period  =  0.515211974736
period_SNR  =  35.1987555592
period_log10FAP  =  -27.318742866
period_uncertainty  =  0.000105954638127
phase_cusum  =  0.281839591375
phase_eta  =  0.142905750569
phi21  =  3.84570901346
phi31  =  4.68137883924
quartile31  =  0.48
r21  =  0.342264935354
r31  =  0.188324118842
shapiro_w  =  0.896682977676
skewness  =  -0.71061527634
slope_per10  =  -0.139167435968
slope_per90  =  0.283666653559
stetson_k  =  0.777422440973
weighted_mean  =  13.5238219343
weighted_std  =  0.300828107221
