<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.342688993117
cusum  =  0.165307893719
eta  =  0.611010495153
hl_amp_ratio  =  0.442995825751
kurtosis  =  -0.506643292246
n_points  =  281
period  =  0.578307293605
period_SNR  =  40.9089230245
period_log10FAP  =  -34.6856157713
period_uncertainty  =  9.54050595084e-05
phase_cusum  =  0.241088203117
phase_eta  =  0.14851502011
phi21  =  0.860204195551
phi31  =  -1.25057668032
quartile31  =  0.46
r21  =  0.440905028146
r31  =  0.247783223142
shapiro_w  =  0.918350160122
skewness  =  -0.730701624521
slope_per10  =  -0.1554495335
slope_per90  =  0.190434273936
stetson_k  =  0.76899725122
weighted_mean  =  13.4588237473
weighted_std  =  0.296627263467
</pre></body></html>