-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.183966543016
cusum  =  0.137199472886
eta  =  0.613690402159
hl_amp_ratio  =  0.596811725664
kurtosis  =  -0.712956432572
n_points  =  431
period  =  0.623386789224
period_SNR  =  53.044199611
period_log10FAP  =  -58.6898218716
period_uncertainty  =  0.000101423077747
phase_cusum  =  0.268576498594
phase_eta  =  0.250852667418
phi21  =  1.12785612685
phi31  =  5.36034782359
quartile31  =  0.215
r21  =  0.444494477848
r31  =  0.162283297797
shapiro_w  =  0.955995976925
skewness  =  -0.461694927671
slope_per10  =  -0.15523900694
slope_per90  =  0.159435130058
stetson_k  =  0.795079646667
weighted_mean  =  16.7183219922
weighted_std  =  0.151037832696
