<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.25880426347
cusum  =  0.139649134265
eta  =  0.635397923098
hl_amp_ratio  =  0.585534261918
kurtosis  =  -0.77522156274
n_points  =  414
period  =  0.536809483018
period_SNR  =  45.2142197777
period_log10FAP  =  -49.1856335502
period_uncertainty  =  9.30238272535e-05
phase_cusum  =  0.212912632257
phase_eta  =  0.505637575248
phi21  =  0.949061105396
phi31  =  1.9992085384
quartile31  =  0.35
r21  =  0.41061446218
r31  =  0.25576572671
shapiro_w  =  0.955190420151
skewness  =  -0.459167074266
slope_per10  =  -0.0961627432783
slope_per90  =  0.123840509262
stetson_k  =  0.804548193818
weighted_mean  =  15.9323861794
weighted_std  =  0.233103964034
</pre></body></html>