-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.22932709324
cusum  =  0.115404487485
eta  =  0.584866629609
hl_amp_ratio  =  0.763852819858
kurtosis  =  -0.693105667281
n_points  =  497
period  =  0.579106231411
period_SNR  =  49.1650554463
period_log10FAP  =  -52.2528176895
period_uncertainty  =  0.000105024709913
phase_cusum  =  0.253046425549
phase_eta  =  0.356341607383
phi21  =  0.79206585546
phi31  =  2.27158126192
quartile31  =  0.34
r21  =  0.547626145148
r31  =  0.376470005694
shapiro_w  =  0.974873542786
skewness  =  -0.341307467296
slope_per10  =  -0.0728821676774
slope_per90  =  0.0680058648787
stetson_k  =  0.816520789694
weighted_mean  =  17.665337633
weighted_std  =  0.21578988766
