-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.42


######### Lightcurve features #########

amplitude  =  0.197769610352
cusum  =  0.29349746199
eta  =  0.447516511509
hl_amp_ratio  =  0.888988186511
kurtosis  =  -0.661314528469
n_points  =  104
period  =  0.213031267898
period_SNR  =  10.1160314764
period_log10FAP  =  -7.66170529197
period_uncertainty  =  9.83978144817e-06
phase_cusum  =  0.296288478895
phase_eta  =  0.628815986034
phi21  =  1.85852878582
phi31  =  3.51135401128
quartile31  =  0.27
r21  =  0.00808431932595
r31  =  0.398215688578
shapiro_w  =  0.965047597885
skewness  =  -0.331628341728
slope_per10  =  -0.187173987381
slope_per90  =  0.101350140493
stetson_k  =  0.800096348593
weighted_mean  =  12.0928846154
weighted_std  =  0.201406941085
