-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  LPV_SRV_AGB_C
class_probability =  0.26


######### Lightcurve features #########

amplitude  =  0.10099477877
cusum  =  0.192133363062
eta  =  1.41401640494
hl_amp_ratio  =  0.851443544783
kurtosis  =  0.2767854269
n_points  =  437
period  =  957.957528
period_SNR  =  23.2470032397
period_log10FAP  =  -10.4348243285
period_uncertainty  =  230.278251923
phase_cusum  =  0.212013201678
phase_eta  =  1.51392017415
phi21  =  -2.86846153166
phi31  =  -5.16380706679
quartile31  =  0.23
r21  =  0.202430839266
r31  =  0.0472492911066
shapiro_w  =  0.987920403481
skewness  =  -0.411812017885
slope_per10  =  -42.1994399991
slope_per90  =  1.8396366544
stetson_k  =  0.797904656252
weighted_mean  =  18.615259857
weighted_std  =  0.169036587573
