-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.323835855223
cusum  =  0.116524810152
eta  =  0.55148923102
hl_amp_ratio  =  0.301300694976
kurtosis  =  -0.162025421454
n_points  =  350
period  =  0.645319529894
period_SNR  =  39.0818618967
period_log10FAP  =  -42.1976631977
period_uncertainty  =  0.000112019085641
phase_cusum  =  0.282206567315
phase_eta  =  0.0801364308795
phi21  =  -2.27913580246
phi31  =  -4.30665540771
quartile31  =  0.3175
r21  =  0.532664812693
r31  =  0.336638188915
shapiro_w  =  0.889040231705
skewness  =  -0.938138754922
slope_per10  =  -0.144216768491
slope_per90  =  0.175260875671
stetson_k  =  0.677563439693
weighted_mean  =  16.4705542594
weighted_std  =  0.267335700405
