-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.81


######### Lightcurve features #########

amplitude  =  0.272461044811
cusum  =  0.139511029091
eta  =  1.29290732107
hl_amp_ratio  =  0.486057530551
kurtosis  =  -0.317644734765
n_points  =  98
period  =  0.148079659834
period_SNR  =  9.60545037158
period_log10FAP  =  -3.17080354402
period_uncertainty  =  5.00463558488e-06
phase_cusum  =  0.256735439179
phase_eta  =  1.0655783102
phi21  =  -0.356828961048
phi31  =  -0.304468898722
quartile31  =  0.3875
r21  =  0.412113897446
r31  =  0.251961784781
shapiro_w  =  0.954677402973
skewness  =  -0.503995453469
slope_per10  =  -0.0228257341899
slope_per90  =  0.0376168945297
stetson_k  =  0.701552741018
weighted_mean  =  17.4634316207
weighted_std  =  0.334887363147
