<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.89


######### Lightcurve features #########

amplitude  =  0.4566116482
cusum  =  0.175394429324
eta  =  0.545144006018
hl_amp_ratio  =  0.188166924025
kurtosis  =  -1.06313183329
n_points  =  236
period  =  0.436046838941
period_SNR  =  29.1059935911
period_log10FAP  =  -29.6717079645
period_uncertainty  =  5.20193315635e-05
phase_cusum  =  0.325927449927
phase_eta  =  0.140837104691
phi21  =  -2.41357267156
phi31  =  -1.58080175037
quartile31  =  0.76
r21  =  0.433883458919
r31  =  0.396989562624
shapiro_w  =  0.853595077991
skewness  =  -0.620812908151
slope_per10  =  -0.159006688469
slope_per90  =  0.213949999306
stetson_k  =  0.715053227565
weighted_mean  =  12.8205333198
weighted_std  =  0.442112519954
</pre></body></html>