-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.96


######### Lightcurve features #########

amplitude  =  0.30541797247
cusum  =  0.128641743181
eta  =  0.491347132176
hl_amp_ratio  =  0.361446221754
kurtosis  =  -0.970767477376
n_points  =  480
period  =  0.652204526144
period_SNR  =  51.7493298628
period_log10FAP  =  -60.9186791525
period_uncertainty  =  0.000111002203057
phase_cusum  =  0.239890270801
phase_eta  =  0.345579269891
phi21  =  0.907865266752
phi31  =  2.02340045251
quartile31  =  0.46
r21  =  0.48758848463
r31  =  0.304291983144
shapiro_w  =  0.904139637947
skewness  =  -0.59293766676
slope_per10  =  -0.106614122761
slope_per90  =  0.0843584225394
stetson_k  =  0.759896920257
weighted_mean  =  16.5502380998
weighted_std  =  0.30520732733
