-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.89


######### Lightcurve features #########

amplitude  =  0.321068703055
cusum  =  0.14572005127
eta  =  0.509075610462
hl_amp_ratio  =  0.359879615753
kurtosis  =  -0.869129847452
n_points  =  159
period  =  0.634156436971
period_SNR  =  16.1140659442
period_log10FAP  =  -14.4212173614
period_uncertainty  =  0.000109036529396
phase_cusum  =  0.22943399915
phase_eta  =  0.354694781193
phi21  =  0.980183911216
phi31  =  2.7050453651
quartile31  =  0.42
r21  =  0.399301053007
r31  =  0.0971107133741
shapiro_w  =  0.930815935135
skewness  =  -0.505775720915
slope_per10  =  -0.213618604263
slope_per90  =  0.40759480514
stetson_k  =  0.757922116379
weighted_mean  =  13.2525593057
weighted_std  =  0.276986169498
