-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.215303429768
cusum  =  0.172815186508
eta  =  0.717709166865
hl_amp_ratio  =  0.959171545251
kurtosis  =  -0.186679782847
n_points  =  478
period  =  0.703139938344
period_SNR  =  43.0437844224
period_log10FAP  =  -40.555179396
period_uncertainty  =  0.000154831174201
phase_cusum  =  0.22517843366
phase_eta  =  0.777451319705
phi21  =  -2.18204204238
phi31  =  -3.85194795001
quartile31  =  0.3275
r21  =  0.444810117135
r31  =  0.253651469205
shapiro_w  =  0.994914889336
skewness  =  -0.103382407852
slope_per10  =  -0.0441160761712
slope_per90  =  0.0676100172462
stetson_k  =  0.795533926437
weighted_mean  =  17.6791498299
weighted_std  =  0.224425250504
