-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.63


######### Lightcurve features #########

amplitude  =  0.555461909804
cusum  =  0.412905524089
eta  =  0.485996663012
hl_amp_ratio  =  0.654262847714
kurtosis  =  -1.11324509161
n_points  =  34
period  =  0.634511040692
period_SNR  =  6.67695489777
period_log10FAP  =  -1.23605122535
period_uncertainty  =  0.000114257693693
phase_cusum  =  0.375310029436
phase_eta  =  0.266177578542
phi21  =  1.46196066154
phi31  =  2.46699920109
quartile31  =  0.51
r21  =  0.711688517148
r31  =  0.644444328765
shapiro_w  =  0.942526638508
skewness  =  -0.0255146714807
slope_per10  =  -0.295290673982
slope_per90  =  0.583014054668
stetson_k  =  0.808398520492
weighted_mean  =  13.8296464646
weighted_std  =  0.281003569952
